SET FOREIGN_KEY_CHECKS = 0;

#-----------------------------------------------------------------------------
#-- gtranslate
#-----------------------------------------------------------------------------

DROP TABLE IF EXISTS `gtranslate`;


CREATE TABLE `gtranslate`
(
	`id` INTEGER(11)  NOT NULL AUTO_INCREMENT,
	`pl` VARCHAR(255),
	`en` VARCHAR(255),
	`de` VARCHAR(255),
	`ru` VARCHAR(255),
	`fr` VARCHAR(255),
	PRIMARY KEY (`id`),
	KEY `pl`(`pl`),
	KEY `en`(`en`),
	KEY `de`(`de`),
	KEY `ru`(`ru`),
	KEY `fr`(`fr`)
)Type=InnoDB;

# This restores the fkey checks, after having unset them earlier
SET FOREIGN_KEY_CHECKS = 1;